-4 -3 -2 -1 0 1 2 3 4

Azimuth (degrees)

                                                                                                         -50

                                                                                                         -40

                                                                                                         -30

                                                                                                         -20
dB

                                                                                                         -10

0

(a)

(c)

(b)