26 27 28 29 30 31 32 33

Frequency (GHz)

34 35 36

                                                                                       -140

                                                                                       -130

                                                                                       -120

                                                                                       -110

                                                                                       -100

                                                                                                     -90

Coupling (dB)

                                                                                                     -80

                                                                                                     -70

(a)

(b)

(c)